ALTER TABLE `project_devices` ADD COLUMN `phase_type` text NOT NULL DEFAULT 'single_phase';
--> statement-breakpoint
UPDATE `project_devices`
SET `phase_type` = CASE WHEN `phase_count` = 3 THEN 'three_phase' ELSE 'single_phase' END;
--> statement-breakpoint
ALTER TABLE `project_devices` ADD COLUMN `connection_kind` text;
--> statement-breakpoint
ALTER TABLE `project_devices` ADD COLUMN `cost_group` text;
--> statement-breakpoint
ALTER TABLE `project_devices` ADD COLUMN `power_per_unit` real NOT NULL DEFAULT 0;
--> statement-breakpoint
UPDATE `project_devices` SET `power_per_unit` = `installed_power_per_unit_kw`;
--> statement-breakpoint
ALTER TABLE `project_devices` ADD COLUMN `simultaneity_factor` real NOT NULL DEFAULT 1;
--> statement-breakpoint
UPDATE `project_devices` SET `simultaneity_factor` = `demand_factor`;
--> statement-breakpoint
ALTER TABLE `project_devices` ADD COLUMN `cos_phi` real;
--> statement-breakpoint
UPDATE `project_devices` SET `cos_phi` = `power_factor`;
--> statement-breakpoint
ALTER TABLE `project_devices` ADD COLUMN `remark` text;
--> statement-breakpoint
UPDATE `project_devices` SET `remark` = `note`;
